Errors in Software

Dear all.

I had mailed before that I have problems with Tranzparenz.

There are still much more faults in the new version. So the complete lower half of the functions disappears in the window "effects". If I use Slide for example, the half of funtions is lost. There is no "Direction", "Slide the old Frame" "Slide the new Frame".

Cutting the Background (Tranzparenz) off, does not work properly.

If I have Tranzpaenz in a picture and lets move this by the effects, a stair effect gets visible.

I think this programm should be tested and checked once again.

I would like to make a constructive contribution with that, not get angry.

I will mailing you a sample Picture on your mail adress Mr. Blumental.

Yours sincerely
Siegfried bendel
Statistics: Posted by sbendel — Tue Mar 29, 2005 2:26 pm